From f24d0233954e8ad0cf0538beadbe71f8201212cb Mon Sep 17 00:00:00 2001
From: Michele Calgaro <michele.calgaro@yahoo.it>
Date: Mon, 10 Feb 2020 10:54:45 +0900
Subject: Corrected comment description of new keyboard LED sync option in tdm
 config.

Signed-off-by: Michele Calgaro <michele.calgaro@yahoo.it>
(cherry picked from commit 1bc47b3d82b4538793987ebb90cab1d7cec9f5f9)
---
 tdm/config.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'tdm/config.def')

diff --git a/tdm/config.def b/tdm/config.def
index 04f3a1d88..6164f2f83 100644
--- a/tdm/config.def
+++ b/tdm/config.def
@@ -2034,7 +2034,7 @@ Instance: #:*/true
 Comment:
  Sync keyboard led status
 Description:
- Enable or disable the use of tdekbdledsync to sync keyboard LED status in tdm.
+ Enable or disable the use of tdekbdledsync to sync keyboard LED status.
 
 Key: UseAdminSession
 Type: bool
-- 
cgit v1.2.1

